Unterschrift-Hilfe

Das Unterschrift-Programm stellt Unterschrifts- oder Faksimilemöglichkeiten unter Programmen zur Verfügung, die das BMP-Dateiformat unterstützen, wie WordPad, Word oder AmiPro.

Unterschreiben: Geben Sie hier die Unterschriftsweise ein. Sie können die Unterschrift direkt auf dem Bildschirm unterbringen.

Senden : gibt Ihre Unterschrift am Ort des Cursors aus.

Löschen: löscht die Unterschrift.

Einrichten: sorgt für die Systemeinrichtung.

Hilfe : zeigt Hilfe zu möglicherweise auftretenden Fragen.

Beenden : beendet das Unterschrifts-Programm.

Stiftfarbe: Einrichten der Stiftfarbe.

 : Automatisches Senden           [image] :  Not Automatisches Senden


Löschen

Löscht die Unterschrift bzw. Handschrift.


Einrichten

Im Systemeinrichtungs-Fenster lassen sich folgende Konfigurationen festlegen.

Stift-Aktivzeit :

Die Zeit, die das System bis zum Einsetzen der Erkennung wartet, nachdem Sie mit dem Schreiben aufgehört haben. Die kürzeste Zeit ist mit »1«, die längste mit »9« eingestellt.

Automatisches Senden:

Gibt die Unterschrift automatisch aus, nachdem Sie mit dem Schreiben aufgehört haben. Die Schaltflächen [Senden] und [Löschen] finden sich nicht auf der Funktionenleiste, falls die Option [Automatisches Senden] deaktiviert ist. Die Option [Automatisches Senden] ist ferner deaktiviert, falls die Option [Stift-Aktivzeit] deaktiviert ist.

Strichglättung :

Aktivieren dieser Option sorgt für eine geglättete Strichführung bei der Unterschrift.

Stiftcursor zeigen :

Aktivieren dieser Option zeigt im Unterschriftsmodus den Cursor als Stift.

Ausgabegröße

Verhältmis :

Aktivieren der Option [Verhältnis] erlaubt, die Unterschrift in ihrer Größe über einen Verhältniswert zu ändern. Bei einem Verhältniswert von 1,00 ist die ausgegebene Unterschrift genauso groß wie die geschriebene.

BxH  :

Durch Aktivieren der Option [BxH] bestimmt sich die Größe der ausgegebenen Unterschrift aus den Einstellungen für Breite und Höhe.

Methode 1: Geben Sie Breite und Höhe der Unterschrift explizit ein.

Methode 2 (visuell) : Klicken Sie auf die Schaltfläche [Ziehen] und ziehen dann auf dem Bildschirm ein Rechteck auf. Die ausgegebene Unterschrift erhält eine Größe, die genau in dieses Rechteck paßt.

Beim Senden auf Datei speichern

Speichern auf BMP-Datei

Falls diese Option gewählt ist, wird die Unterschrift beim Senden als Datei im .BMP-Format gespeichert.

Speichern auf Ink-Datei

Falls diese Option gewählt ist, wird die Unterschrift beim Senden als Datei im .Ink-Format (Tintendatei) gespeichert.

Ok :

Klicken Sie auf die Schaltfläche [OK], wenn Sie fertig sind.

Abbrechen :

Läßt Ihre Einstellungen ohne Wirkung.


Stiftfarbe

Stellt eine Reihe von Farben und Stärken des Stifts zur Verfügung. Sie können die Stiftfarbe und -stärke frei variieren, außerdem ein Bild zur Bereicherung Ihres Dokuments malen.

Um die Stiftfarbe zu wählen, klicken Sie auf [image], und wählen dann die gewünschte Farbe.

Um die Stiftstärke zu wählen, klicken Sie auf [image], und wählen dann die gewünschte Stärke.